Oberhuber (in-situ)

Mechoso (model)

Gautier (satellite)

Weare (in-situ)

12-month Climatology

Derived from COADS

2x2 Degree Resolution

60-month UCLA AGCM simulation

Forced with obs. SST, 1971-83

4x5 Degree Resolution

45 months, 7/87-3/91

Derived from SSMI and CAC

SST using method of Liu.

1x1 Degree Resolution

240 months, 1/57-12/76

Derived from COADS

5x5 Degree Resolution

Evaporation

W/m2

160

200

240

280

120

80

40

0

Associated Fields

% Missing Data

References

Detailed Comments

File Name

Other Information

Plate 1. Visualization system presents the above display from the information

returned by the DBMS, based on the query for evaporative heat flux data sets.